ALTER ROLE azaion_admin WITH PASSWORD 'test_password';
ALTER ROLE azaion_reader WITH PASSWORD 'test_password';

UPDATE public.users
SET password_hash = 'elZ/nqXsL8E8T1V+9ZPb0bI4HZD0Sc7/ok9DdfxVFjQuGHj+Scya3q9wLXiX+I36'
WHERE email = 'admin@azaion.com';

UPDATE public.users
SET password_hash = '9cB4uEZlzPYisU4Dh73g+4U81rpeduPyv5Bs9nLMYzzoypEHYXQlTS4azDoVZd3l'
WHERE email = 'uploader@azaion.com';
